From b760658a92b9a237c65416aeafb07eadd361dca6 Mon Sep 17 00:00:00 2001
From: Iru Cai <mytbk920423@gmail.com>
Date: Fri, 17 May 2019 06:41:48 +0800
Subject: upd

---
 chap/chap2.tex | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'chap/chap2.tex')

diff --git a/chap/chap2.tex b/chap/chap2.tex
index 17f99c1..86ab846 100644
--- a/chap/chap2.tex
+++ b/chap/chap2.tex
@@ -615,13 +615,13 @@ ARM 处理器上进行验证，确认它们受 Spectre v1 的影响。
 如图\ref{lst:spec-buf-overflow}中的程序：
 
 \begin{figure}
-  \centering
-  \caption{推测式缓冲区溢出}
-  \label{lst:spec-buf-overflow}
 \begin{minted}{C}
 if (x < len)
     a[x] = z;
 \end{minted}
+  \centering
+  \caption{推测式缓冲区溢出}
+  \label{lst:spec-buf-overflow}
 \end{figure}
 
 攻击者给出一个超过数组 \verb|a| 大小的 \verb|x| 时，在推测式执行时，会
-- 
cgit v1.2.3

